'use client';

import { useEffect } from 'react';
import { useAuth } from '@/lib/auth';

export default function Home() {
  const { user, isLoading } = useAuth();
  
  // Add debug logs
  console.log('Root page state:', { isLoading, userAuthenticated: !!user });
  
  useEffect(() => {
    if (!isLoading) {
      console.log('Preparing to redirect from root page', { isLoggedIn: !!user });
      
      // Use hard redirect to ensure full page refresh
      if (user) {
        console.log('User is logged in, redirecting to analytics page');
        window.location.href = '/analytics';
      } else {
        console.log('User is not logged in, redirecting to login page');
        window.location.href = '/login';
      }
    }
  }, [isLoading, user]);
  
  // Display loading indicator with status information
  return (
    <div className="flex items-center justify-center min-h-screen">
      <div className="text-center">
        <div className="animate-spin rounded-full h-16 w-16 border-t-2 border-b-2 border-blue-500 mx-auto"></div>
        <p className="mt-4 text-lg text-gray-700">Loading...</p>
        <p className="mt-2 text-sm text-gray-500">
          Status: {isLoading ? 'Checking login status' : (user ? 'Logged in' : 'Not logged in')}
        </p>
      </div>
    </div>
  );
}